    Remote File Distribution Logs

    When file distribution jobs are run (in background) at their
    scheduled times, a log is created showing their execution time and
    completion status. This window lists all remote file distribution
    logs.

    From this window you can:

    + View View the backup log in a window.
    + Delete Delete the selected backup logs.
    + Print Log Print (make a hardcopy) a backup log.

    View

    Click on this button to view the contents of the selected status log
    in a separate window. Click on the Enlighten icon when you are done
    viewing the log.

    Delete

    Click on this button to delete the selected distribution job status
    logs. Enlighten will prompt you to confirm your action.

    Print Log

    Click on this button to print the selected distribution job status
    logs to your default printer. Enlighten will prompt you to confirm
    your action.
